; STANDARD WEP PROVIDED BY VISUAL C++ 1.51.
LIBRARY   DLL
EXETYPE   WINDOWS
CODE      PRELOAD MOVEABLE DISCARDABLE
DATA      PRELOAD MOVEABLE SINGLE
HEAPSIZE  1024
EXPORTS
          WEP PRIVATE
; To implement your own Windows Exit Procedure add the following
; function to your application (referring to it in the .def file is
; not required.)  The extern "C" is only required if module is C++.
; extern "C" int FAR PASCAL _WEP(int)
; {
;       /* Your WEP functionality goes here */
;  return 1;
; }
